Figure 1. J band (left) and K band (right) images of one of two new clusters detected by cross correlating with a list of red MSX mid-infrared sources. The JHK colours for the brighter stars allow us to derive an average extinction value of A_V =7.5 mag and the K band data permit us to characterise the size of the cluster.